<template>
  <div class="application">
    <b-navbar toggleable="md" type="dark" variant="primary">

      <b-navbar-brand to="/">
        <b-icon-bug-fill /> MalwareMultiScan
      </b-navbar-brand>

      <b-navbar-toggle target="nav-collapse" />

      <b-collapse id="nav-collapse" is-nav>
        <b-navbar-nav class="ml-auto">
          <b-nav-form>
            <b-button href="https://github.com/mindcollapse/MalwareMultiScan" variant="dark" size="sm" target="_blank">
              <b-icon-code /> GitHub
            </b-button>
          </b-nav-form>
        </b-navbar-nav>
      </b-collapse>
    </b-navbar>

    <b-container :fluid="true" class="mt-3">
      <nuxt />
    </b-container>
  </div>
</template>
